en	The password must match the following requirements:

en	Minimum length: %d chars

en	At least one upper case char

en	At least one lower case char

en	At least one digit

en	At least one special char

en	Must be different from current password

en	The password is too short. Minimum length is %d chars

en	The password must at least contain one upper case char

en	The password must at least contain one lower case char

en	The password must at least contain one digit

en	The password must at least contain one special char

en	The password must be different from the old password

en	Password not saved ({table}:{uid}):