en	Time-based one-time password

en	This provider allows to authenticate with a single-use passcode which is based on the current time. Each code is only valid for 30 seconds. You need an OTP application or device, supporting such tokens.

en	The time-based one-time password provider enables you to strengthen your accounts' security by requiring a six-digit code on every login. This provider is based on a shared secret, which will be exchanged between your OTP application (or device) and TYPO3. Each code takes the current time into account and is only valid for 30 seconds. Setting up: 1. Scan the QR-code or directly enter the shared secret in your application or device 2. Add a specific name for this provider (optional) 3. Enter the generated six-digit code in the corresponding field 4. Submit the form to activate the provider Note: In case your application supports otpauth:// URLs, you can retrieve the URL by clicking on the info button next to the shared secret.

en	Recovery codes

en	This provider allows to authenticate with a set of single-use passcodes, in case you lost your primary MFA credentials, or just have no access to them temporarily.

en	Recovery codes are random eight-digit codes which can be used to authenticate, in case your lost your main authentication credentials. Each code is only valid once. As soon as all recovery codes are exhausted, you're required to generate a new set. Therefore, periodically check the amount of remaining codes in the Edit / Change view of the provider. Setting up: 1. Copy the recovery codes and store them at a safe place 2. Add a specific name for this provider (optional) 3. Submit the form to activate the provider - see below note Note: Since the recovery codes are being encrypted and stored securely, this process can take some time.

en	Enter the generated six-digit code

en	This code should now be displayed on your device or in your application.

en	The maximum attempts for this provider are exceeded. Please use another provider or contact your administrator.

en	Provider information

en	Name

en	Enter a name

en	Recovery codes left

en	Last used

en	Never

en	Last updated

en	Regenerate recovery codes

en	If you lost your recovery codes or just want to get fresh ones, you can regenerate them by selecting the checkbox below. You've currently %d codes left.

en	Regenerate recovery codes

en	Step 1

en	Step 1a

en	Step 1b

en	Step 2

en	Step 3

en	Scan the displayed QR code

en	Scan this code with your OTP application (e.g. Google Authenticator).

en	Copy the shared secret

en	You can also enter the shared secret manually in your OTP application or device.

en	Enter a name (optional)

en	Specify a custom name for this provider.

en	Recovery codes

en	Copy these codes and store them at a safe place.

en	Reload recovery codes

en	Reload

en	Setup not possible

en	Recovery codes are only meant as a fallback if you lose access to your main multi-factorauthentication credentials. Therefore, please activate a comprehensive MFA provider first.

en	Show authentication URL

en	Authentication URL

en	In case you are not able to scan the QR code, but your OTP application supports authentication URLs next to, or instead of plain shared secrets, you can copy and paste the URL shown below. The URL contains some information like the issuer (this site) and your email address or username. Most OTP applications will display this information next to the generated codes.

en	OK

en	Enter the six-digit code

en	Enter an eight-digit recovery code

en	Your recovery codes were automatically updated!

en	Please copy and store them at a safe place: %s

en	Recovery codes successfully regenerated

en	Please copy and store them at a safe place: %s