en	You are now logged in as '%s'

en	User login

en	Enter your username and password here in order to log in on the website

en	You have logged out.

en	You just logged out from your user session on this website. You can login again or as another user by the form below.

en	Login failure

en	An error occurred during login. Most likely you didn't enter the username or password correctly. Be certain that you enter them precisely as they are, including upper/lower case. Another possibility is that cookies might be disabled in your web browser.

en	Login successful

en	You are now logged in as '###USER###'

en	Current status

en	This is your current status

en	Warning: There is a possibility that cookies are not enabled in your web browser! If your login disappears on your next click that is the case and you should enable cookies (or accept cookies from this website) immediately!

en	Username

en	Password

en	Login

en	Stay logged in

en	Logout

en	Send password

en	Reset Password

en	Change your password

en	Please enter your new password twice.

en	Ensure that your new password matches the following requirements:

en	Error: there is no prefix for the link. Please set one of the following in your typoscript: plugin.tx_felogin_pi1.feloginBaseURL = http://yourdomain/, config.baseURL = http://yourdomain/, config.absRefPrefix = /

en	The link you clicked is not valid. Please repeat the forgot password procedure.

en	The passwords are not equal, please enter your new password twice. Password needs a minimum length of %s chars.

en	The password length is too short. Please enter your new password twice. Password needs a minimum length of %s chars.

en	Your password has been saved. You can now login with your new password.

en	Change your password

en	Enter new password

en	Repeat new password

en	Your email

en	Forgot your password?

en	Your password Hi %s Your username is "%s" Your password is "%s"

en	Your password Hi %s We couldn't find a username for this email address and so cannot send the password to you. Probably you misspelled the email address (upper/lower case makes a difference) or maybe you even didn't register yet?

en	Your new password Dear %s, This email was sent in response to your request to reset your password. Please click on the link below. %s For security reasons, this link is only active until %s. If you do not visit the link before then, you will need to repeat the password reset steps.

en	Please enter the email address by which you registered your user account. Then press "Send password" and your password will immediately be emailed to you. Make sure to spell your email address correctly.

en	Your password has now been sent to the email address %s

en	Please enter your username or email address. Instructions for resetting the password will be immediately emailed to you.

en	An email has been sent to the address stored in your account and contains a link to reset your password. If you do not receive an email, your account or email address was not found.

en	Return to login form

en	Username or email address

en	Your new password

en	Password recovery link

en	Your password recovery link is expired.

en	New password and new password repeat cannot be empty

en	New Password must match repeated password.

en	<p>Dear %s,</p> <p>This email was sent in response to your request to reset your password. Please click on the link below.</p> <p>%s</p> <p>For security reasons, this link is only active until %s. If you do not visit the link before then, you will need to repeat the password reset steps.</p>

en	Dear %s, This email was sent in response to your request to reset your password. Please click on the link below. %s For security reasons, this link is only active until %s. If you do not visit the link before then, you will need to repeat the password reset steps.