en	RSS Feed

en	Displays the latest entries from a customizable RSS feed.

en	Label

en	Defines the label of the widget.

en	RSS Feed

en	Defines the URL or file providing the RSS Feed. This is read by the widget in order to fetch entries to show.

en	Limit

en	Defines how many RSS items should be shown.

en	Lifetime

en	Defines how long to wait, in seconds, until fetching RSS Feed again.

en	Missing feed configuration

en	Please configure a feed URL to retrieve items from.

en	Feed error

en	The feed at "%1$s" could not be parsed.

en	No items to display

en	The feed at "%1$s" does not contain any items.